)^2c

(GeV/ μμm 0 20 40 60 80 100 120 140

)^2c

(counts/3.0 GeV/ m/d Nd

0 1 2 3 4 5 6 7 8 = 5.02 TeV NNs ALICE, p-Pb < 3.53 cms μμy 2.03 <

Data POWHEG